-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.311400112257
cusum  =  0.0729814741164
eta  =  0.73246002195
hl_amp_ratio  =  0.621775203469
kurtosis  =  -0.841633787308
n_points  =  267
period  =  0.724327559075
period_SNR  =  40.7047501495
period_log10FAP  =  -33.0659150902
period_uncertainty  =  0.000150150826897
phase_cusum  =  0.264351974792
phase_eta  =  0.0817164826211
phi21  =  1.1501819392
phi31  =  -0.837615446252
quartile31  =  0.425
r21  =  0.570705477392
r31  =  0.332935799849
shapiro_w  =  0.930839419365
skewness  =  -0.52462192107
slope_per10  =  -0.240676630745
slope_per90  =  0.387871526875
stetson_k  =  0.783530913839
weighted_mean  =  13.0579154707
weighted_std  =  0.277926333047
