-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.241918544883
cusum  =  0.12826726019
eta  =  1.00719680984
hl_amp_ratio  =  0.32104991493
kurtosis  =  -0.232423779466
n_points  =  133
period  =  0.602444861372
period_SNR  =  18.8283446836
period_log10FAP  =  -10.6620689899
period_uncertainty  =  0.000152231401827
phase_cusum  =  0.294096102754
phase_eta  =  0.338153176147
phi21  =  0.670341025201
phi31  =  -1.20763882361
quartile31  =  0.28
r21  =  0.447514585726
r31  =  0.294247475842
shapiro_w  =  0.908387303352
skewness  =  -0.745632585108
slope_per10  =  -0.309919381079
slope_per90  =  0.38105687895
stetson_k  =  0.716222473947
weighted_mean  =  15.445810463
weighted_std  =  0.174224778202
