<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.24


######### Lightcurve features #########

amplitude  =  0.0296638150352
cusum  =  0.195580089147
eta  =  1.09633961549
hl_amp_ratio  =  1.43697112717
kurtosis  =  1.17635372762
n_points  =  36
period  =  0.741048550306
period_SNR  =  6.71106358399
period_log10FAP  =  -0.184003299055
period_uncertainty  =  0.000164769002099
phase_cusum  =  0.195580089147
phase_eta  =  1.37228904252
phi21  =  2.94267665783
phi31  =  3.67743196178
quartile31  =  0.0225
r21  =  0.0228470088655
r31  =  0.213288606734
shapiro_w  =  0.944311916828
skewness  =  -0.406972639897
slope_per10  =  -1.77866852189
slope_per90  =  3.01770042353
stetson_k  =  0.737806544341
weighted_mean  =  14.123047619
weighted_std  =  0.0195727609325
</pre></body></html>