<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.29


######### Lightcurve features #########

amplitude  =  0.037909956291
cusum  =  0.143824470744
eta  =  1.46932781476
hl_amp_ratio  =  0.74720302754
kurtosis  =  0.976260698424
n_points  =  166
period  =  0.574982701675
period_SNR  =  12.5930104481
period_log10FAP  =  -3.38229655105
period_uncertainty  =  0.000105831533037
phase_cusum  =  0.21959052296
phase_eta  =  1.51211348848
phi21  =  2.0590301454
phi31  =  1.71900119811
quartile31  =  0.06
r21  =  0.270115510042
r31  =  0.104345231012
shapiro_w  =  0.965136885643
skewness  =  -0.716076847814
slope_per10  =  -0.243219240856
slope_per90  =  0.303500005975
stetson_k  =  0.739972884089
weighted_mean  =  16.025657971
weighted_std  =  0.0534914690439
</pre></body></html>