-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.52


######### Lightcurve features #########

amplitude  =  0.186424037714
cusum  =  0.275586798548
eta  =  0.407657070631
hl_amp_ratio  =  0.774117623224
kurtosis  =  0.135637045955
n_points  =  121
period  =  0.34538461499
period_SNR  =  12.5749864365
period_log10FAP  =  -9.90641943478
period_uncertainty  =  3.68780023459e-05
phase_cusum  =  0.20915708548
phase_eta  =  0.706409636352
phi21  =  1.76747377404
phi31  =  1.6670490687
quartile31  =  0.2
r21  =  0.0171444480983
r31  =  0.221740686571
shapiro_w  =  0.975400805473
skewness  =  -0.444803688965
slope_per10  =  -0.290435951648
slope_per90  =  0.341050010175
stetson_k  =  0.773244225921
weighted_mean  =  14.4824634146
weighted_std  =  0.148708357165
