-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.171556161018
cusum  =  0.1234013528
eta  =  0.541308461244
hl_amp_ratio  =  0.576555699253
kurtosis  =  -0.444508204899
n_points  =  405
period  =  0.625156929016
period_SNR  =  49.3177859643
period_log10FAP  =  -51.2127648911
period_uncertainty  =  0.000111714965722
phase_cusum  =  0.243620746271
phase_eta  =  0.3995505049
phi21  =  0.951063489357
phi31  =  -1.12214755449
quartile31  =  0.2
r21  =  0.431473138337
r31  =  0.215193514857
shapiro_w  =  0.955794274807
skewness  =  -0.4889413922
slope_per10  =  -0.211045760556
slope_per90  =  0.185525517634
stetson_k  =  0.785908414051
weighted_mean  =  13.4309946348
weighted_std  =  0.134750810096
