-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.2861969427
cusum  =  0.225683889166
eta  =  0.50701427778
hl_amp_ratio  =  0.608933227311
kurtosis  =  -0.549147564025
n_points  =  438
period  =  0.612967365294
period_SNR  =  40.0848201336
period_log10FAP  =  -41.0746066896
period_uncertainty  =  0.000104659094121
phase_cusum  =  0.206672677415
phase_eta  =  0.674714553561
phi21  =  0.532243256818
phi31  =  1.35898545909
quartile31  =  0.45
r21  =  0.399454336017
r31  =  0.17602860806
shapiro_w  =  0.930839300156
skewness  =  -0.650973684479
slope_per10  =  -0.0547699993476
slope_per90  =  0.0596016212271
stetson_k  =  0.799898362056
weighted_mean  =  16.5980086166
weighted_std  =  0.29308275166
