-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.174153469336
cusum  =  0.103492039343
eta  =  0.634193596569
hl_amp_ratio  =  0.755409082866
kurtosis  =  -0.899552398692
n_points  =  544
period  =  0.63211581261
period_SNR  =  43.9333492491
period_log10FAP  =  -75.3346784761
period_uncertainty  =  0.000111319356057
phase_cusum  =  0.23396821246
phase_eta  =  0.469252964524
phi21  =  -2.11159262047
phi31  =  -3.84731870622
quartile31  =  0.24
r21  =  0.327060753137
r31  =  0.133022468885
shapiro_w  =  0.964455783367
skewness  =  -0.230947008259
slope_per10  =  -0.070001764485
slope_per90  =  0.109183651422
stetson_k  =  0.843967306293
weighted_mean  =  14.6526795764
weighted_std  =  0.152361046579
