-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.343222865709
cusum  =  0.115061917159
eta  =  0.615514239704
hl_amp_ratio  =  0.528120320843
kurtosis  =  0.447715066193
n_points  =  397
period  =  0.608461373494
period_SNR  =  50.0453329675
period_log10FAP  =  -49.732181332
period_uncertainty  =  0.000125671889732
phase_cusum  =  0.221996864815
phase_eta  =  0.18820558554
phi21  =  -2.04575561444
phi31  =  -3.98012858067
quartile31  =  0.39
r21  =  0.483540006829
r31  =  0.269945061662
shapiro_w  =  0.93269777298
skewness  =  -0.922493111621
slope_per10  =  -0.098333151648
slope_per90  =  0.127828425344
stetson_k  =  0.762151376911
weighted_mean  =  13.5036651902
weighted_std  =  0.284527606463
