-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.75


######### Lightcurve features #########

amplitude  =  0.30740374603
cusum  =  0.186550539016
eta  =  0.613686439215
hl_amp_ratio  =  0.360055473411
kurtosis  =  -0.658607443871
n_points  =  162
period  =  0.577451792112
period_SNR  =  22.3484445329
period_log10FAP  =  -18.0173280782
period_uncertainty  =  0.000148981380229
phase_cusum  =  0.332628879694
phase_eta  =  0.094484263551
phi21  =  -2.11391915321
phi31  =  -4.06431016866
quartile31  =  0.42
r21  =  0.530012170503
r31  =  0.310198391184
shapiro_w  =  0.912703812122
skewness  =  -0.677553961248
slope_per10  =  -0.284928899023
slope_per90  =  0.588037039894
stetson_k  =  0.743900091586
weighted_mean  =  13.9948709975
weighted_std  =  0.254230853663
