-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.84


######### Lightcurve features #########

amplitude  =  0.237168444603
cusum  =  0.110374187568
eta  =  1.0440165109
hl_amp_ratio  =  0.786153932325
kurtosis  =  0.147259177142
n_points  =  203
period  =  0.596360595121
period_SNR  =  27.189838134
period_log10FAP  =  -16.6028888152
period_uncertainty  =  0.000147166481523
phase_cusum  =  0.252312179193
phase_eta  =  0.815045068292
phi21  =  0.57299989909
phi31  =  1.29375996738
quartile31  =  0.325
r21  =  0.360359603496
r31  =  0.244494556321
shapiro_w  =  0.977046191692
skewness  =  0.237823448856
slope_per10  =  -0.137166671144
slope_per90  =  0.230293322083
stetson_k  =  0.799981421162
weighted_mean  =  15.5806230219
weighted_std  =  0.230387760572
