-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.176042524349
cusum  =  0.270968296613
eta  =  0.794618605054
hl_amp_ratio  =  0.713034310326
kurtosis  =  -0.271327887819
n_points  =  53
period  =  0.615000787341
period_SNR  =  10.422489963
period_log10FAP  =  -2.59008269898
period_uncertainty  =  0.000118671042244
phase_cusum  =  0.249878696308
phase_eta  =  0.311565798346
phi21  =  0.705491664551
phi31  =  -0.786770484034
quartile31  =  0.2
r21  =  0.489304930106
r31  =  0.238909025509
shapiro_w  =  0.939046382904
skewness  =  -0.644330068828
slope_per10  =  -0.811764023647
slope_per90  =  1.42361436068
stetson_k  =  0.798218234418
weighted_mean  =  13.1262237762
weighted_std  =  0.143645368468
