-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.289948764431
cusum  =  0.201306169116
eta  =  0.696296895391
hl_amp_ratio  =  0.276563394535
kurtosis  =  -0.0362721049222
n_points  =  200
period  =  0.531455696871
period_SNR  =  30.1882275579
period_log10FAP  =  -22.0161965021
period_uncertainty  =  0.000133598725076
phase_cusum  =  0.235474254752
phase_eta  =  0.103311433559
phi21  =  -2.37592164247
phi31  =  -4.50992202489
quartile31  =  0.3225
r21  =  0.497336883801
r31  =  0.328194180229
shapiro_w  =  0.86878234148
skewness  =  -1.02301739305
slope_per10  =  -0.232070366081
slope_per90  =  0.215483811941
stetson_k  =  0.650236718181
weighted_mean  =  16.4597571888
weighted_std  =  0.252840430899
