-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.4


######### Lightcurve features #########

amplitude  =  0.165916731893
cusum  =  0.0904964201645
eta  =  0.591927495931
hl_amp_ratio  =  0.76514305973
kurtosis  =  -0.819467514766
n_points  =  318
period  =  0.417501773924
period_SNR  =  41.5797679395
period_log10FAP  =  -42.9463478281
period_uncertainty  =  4.85354312183e-05
phase_cusum  =  0.27211015606
phase_eta  =  0.518096143269
phi21  =  1.6644921116
phi31  =  -0.151499812281
quartile31  =  0.2
r21  =  0.174867141073
r31  =  0.0969132395731
shapiro_w  =  0.956982135773
skewness  =  -0.394706459216
slope_per10  =  -0.133138517568
slope_per90  =  0.110619553719
stetson_k  =  0.840940678908
weighted_mean  =  15.6565058981
weighted_std  =  0.132452277035
