-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.31912119963
cusum  =  0.176726675221
eta  =  0.569769059373
hl_amp_ratio  =  0.705078621778
kurtosis  =  -0.70011702526
n_points  =  322
period  =  0.67794543505
period_SNR  =  48.5460640375
period_log10FAP  =  -47.0171231494
period_uncertainty  =  0.00013028393018
phase_cusum  =  0.311452481416
phase_eta  =  0.0560633791417
phi21  =  -1.95045998512
phi31  =  -3.7013516119
quartile31  =  0.36
r21  =  0.501813087884
r31  =  0.277957678952
shapiro_w  =  0.947574973106
skewness  =  -0.503947688327
slope_per10  =  -0.198687805966
slope_per90  =  0.387998876361
stetson_k  =  0.817619862695
weighted_mean  =  13.6882025143
weighted_std  =  0.24183485833
