-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.72


######### Lightcurve features #########

amplitude  =  0.226350008883
cusum  =  0.217419275191
eta  =  0.703211663502
hl_amp_ratio  =  0.392896785467
kurtosis  =  -0.996099736561
n_points  =  78
period  =  0.590483156851
period_SNR  =  17.0603973587
period_log10FAP  =  -6.81237897129
period_uncertainty  =  0.00020272942055
phase_cusum  =  0.332454840725
phase_eta  =  0.286150330951
phi21  =  3.692455209
phi31  =  4.98922709021
quartile31  =  0.355
r21  =  0.551586061558
r31  =  0.341969944918
shapiro_w  =  0.901549100876
skewness  =  -0.578775531661
slope_per10  =  -0.314224213442
slope_per90  =  0.550733953532
stetson_k  =  0.780513077137
weighted_mean  =  14.3888148022
weighted_std  =  0.208069745297
