<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.517995961502
cusum  =  0.151477282648
eta  =  0.650071946754
hl_amp_ratio  =  0.0807551136114
kurtosis  =  -0.551486256606
n_points  =  131
period  =  0.441954804673
period_SNR  =  18.7552866159
period_log10FAP  =  -13.6497189555
period_uncertainty  =  7.05232041036e-05
phase_cusum  =  0.282505043831
phase_eta  =  0.203398810133
phi21  =  0.474680009422
phi31  =  1.00409380702
quartile31  =  0.685
r21  =  0.497934227357
r31  =  0.299271263738
shapiro_w  =  0.73665201664
skewness  =  -1.05941539385
slope_per10  =  -0.127628697136
slope_per90  =  0.34119481386
stetson_k  =  0.583115507558
weighted_mean  =  12.9820839363
weighted_std  =  0.519163859557
</pre></body></html>