-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.213874807044
cusum  =  0.121180255419
eta  =  0.747234509935
hl_amp_ratio  =  0.671496130877
kurtosis  =  -0.426278224365
n_points  =  379
period  =  0.696729726581
period_SNR  =  39.7889863997
period_log10FAP  =  -38.9602513718
period_uncertainty  =  0.00013530834922
phase_cusum  =  0.25066133121
phase_eta  =  0.631820997466
phi21  =  1.28510603405
phi31  =  -0.391942386584
quartile31  =  0.3
r21  =  0.499390114168
r31  =  0.260746369734
shapiro_w  =  0.981648862362
skewness  =  -0.104293256248
slope_per10  =  -0.125070086053
slope_per90  =  0.177500001931
stetson_k  =  0.783504336627
weighted_mean  =  15.8177828673
weighted_std  =  0.204530088021
