-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.370050157238
cusum  =  0.129031177146
eta  =  0.622180181907
hl_amp_ratio  =  0.438739944709
kurtosis  =  -1.03990422662
n_points  =  267
period  =  0.544156956036
period_SNR  =  36.3743583321
period_log10FAP  =  -31.0097130673
period_uncertainty  =  0.000101370524389
phase_cusum  =  0.271837873139
phase_eta  =  0.159016378675
phi21  =  0.684525762827
phi31  =  1.92106897484
quartile31  =  0.59
r21  =  0.56627803162
r31  =  0.389407271849
shapiro_w  =  0.920124769211
skewness  =  -0.505065754687
slope_per10  =  -0.184875070592
slope_per90  =  0.182634858563
stetson_k  =  0.779615848356
weighted_mean  =  14.9995922607
weighted_std  =  0.352676506834
