-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.32781804819
cusum  =  0.213247677003
eta  =  0.598007975967
hl_amp_ratio  =  0.229678112773
kurtosis  =  -0.508173540871
n_points  =  172
period  =  0.559987476856
period_SNR  =  24.2209111792
period_log10FAP  =  -19.9660675474
period_uncertainty  =  0.00016548094572
phase_cusum  =  0.338939526601
phase_eta  =  0.132875156899
phi21  =  -2.17224300318
phi31  =  -1.28109236086
quartile31  =  0.4125
r21  =  0.415824045771
r31  =  0.365391014598
shapiro_w  =  0.886588454247
skewness  =  -0.576297390604
slope_per10  =  -0.217750004958
slope_per90  =  0.408422816008
stetson_k  =  0.693224811832
weighted_mean  =  14.9066556113
weighted_std  =  0.296662377517
