<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.346669638843
cusum  =  0.158290816641
eta  =  0.515787457379
hl_amp_ratio  =  0.428406118457
kurtosis  =  -0.630160498396
n_points  =  131
period  =  0.590202367232
period_SNR  =  19.6270920557
period_log10FAP  =  -14.5322696669
period_uncertainty  =  0.000125767642551
phase_cusum  =  0.259662247911
phase_eta  =  0.290722976876
phi21  =  -2.12771689875
phi31  =  -4.20541047009
quartile31  =  0.44
r21  =  0.379623097447
r31  =  0.300579427629
shapiro_w  =  0.891932368279
skewness  =  -0.77951924419
slope_per10  =  -0.135338369587
slope_per90  =  0.389900794662
stetson_k  =  0.730300594489
weighted_mean  =  15.732989782
weighted_std  =  0.316808803201
</pre></body></html>