-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.228911008717
cusum  =  0.200474406608
eta  =  0.46729186477
hl_amp_ratio  =  0.92627462153
kurtosis  =  0.197901804623
n_points  =  145
period  =  0.542830254011
period_SNR  =  15.5885072985
period_log10FAP  =  -12.4721242205
period_uncertainty  =  0.000103672703172
phase_cusum  =  0.252650234452
phase_eta  =  0.490278427136
phi21  =  -1.57397530382
phi31  =  -1.71194974282
quartile31  =  0.21
r21  =  0.379625873937
r31  =  0.166754144461
shapiro_w  =  0.977451264858
skewness  =  -0.193253147762
slope_per10  =  -0.232660701773
slope_per90  =  0.270607472375
stetson_k  =  0.748397524427
weighted_mean  =  10.9698734177
weighted_std  =  0.190956908592
