-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.200742849283
cusum  =  0.135973024225
eta  =  0.549388440019
hl_amp_ratio  =  0.570800328091
kurtosis  =  -0.106275687819
n_points  =  311
period  =  0.575357914325
period_SNR  =  37.6852285382
period_log10FAP  =  -38.6119883766
period_uncertainty  =  0.000133096681304
phase_cusum  =  0.291016841718
phase_eta  =  0.408441093479
phi21  =  0.919073702575
phi31  =  -1.05430632078
quartile31  =  0.31
r21  =  0.403474064538
r31  =  0.237336159309
shapiro_w  =  0.928994238377
skewness  =  -0.765979347396
slope_per10  =  -0.1694417907
slope_per90  =  0.230268169897
stetson_k  =  0.800253222719
weighted_mean  =  13.1732797428
weighted_std  =  0.18925522214
