-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.345047206029
cusum  =  0.230042511085
eta  =  0.499322581433
hl_amp_ratio  =  0.519167668767
kurtosis  =  -0.561839357887
n_points  =  132
period  =  0.595380079972
period_SNR  =  17.2943065096
period_log10FAP  =  -12.3744507934
period_uncertainty  =  0.000102395751584
phase_cusum  =  0.265219283844
phase_eta  =  0.552703931107
phi21  =  0.911022429104
phi31  =  -1.01525266972
quartile31  =  0.4425
r21  =  0.362098997617
r31  =  0.129300439065
shapiro_w  =  0.923083782196
skewness  =  -0.672618446065
slope_per10  =  -0.1800566086
slope_per90  =  0.46404706394
stetson_k  =  0.774414785892
weighted_mean  =  15.3082687357
weighted_std  =  0.304267751163
