-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.30470242922
cusum  =  0.152882480734
eta  =  0.538028418691
hl_amp_ratio  =  0.434005031776
kurtosis  =  -0.848959065431
n_points  =  298
period  =  0.620744772005
period_SNR  =  33.5612497678
period_log10FAP  =  -33.4686010853
period_uncertainty  =  0.000107224623399
phase_cusum  =  0.272287526322
phase_eta  =  0.562478521827
phi21  =  -2.23206601918
phi31  =  -1.64670817667
quartile31  =  0.4775
r21  =  0.362420596457
r31  =  0.248015200409
shapiro_w  =  0.902629256248
skewness  =  -0.646608658148
slope_per10  =  -0.115508071678
slope_per90  =  0.123367700242
stetson_k  =  0.768682093703
weighted_mean  =  15.9946477141
weighted_std  =  0.296780700222
