-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.328317880195
cusum  =  0.137635502463
eta  =  0.496753035628
hl_amp_ratio  =  0.477241580377
kurtosis  =  -0.4614906717
n_points  =  279
period  =  0.626549437606
period_SNR  =  32.5949034592
period_log10FAP  =  -31.0797480277
period_uncertainty  =  0.000110815255823
phase_cusum  =  0.191045119147
phase_eta  =  0.254938104694
phi21  =  -2.34170576073
phi31  =  -4.26809548762
quartile31  =  0.415
r21  =  0.571037261109
r31  =  0.364784543327
shapiro_w  =  0.924411475658
skewness  =  -0.727720175873
slope_per10  =  -0.224707889199
slope_per90  =  0.288917368746
stetson_k  =  0.734580116986
weighted_mean  =  15.5336838705
weighted_std  =  0.278959309058
