-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.29051129395
cusum  =  0.162243356894
eta  =  0.650048128417
hl_amp_ratio  =  0.497465527329
kurtosis  =  -1.05162009393
n_points  =  200
period  =  0.54459735029
period_SNR  =  30.5568555568
period_log10FAP  =  -23.9066814166
period_uncertainty  =  0.00014028783724
phase_cusum  =  0.26579184792
phase_eta  =  0.105494303009
phi21  =  0.84961745266
phi31  =  -1.01998208487
quartile31  =  0.43
r21  =  0.44460420104
r31  =  0.376691173376
shapiro_w  =  0.930655658245
skewness  =  -0.432611064959
slope_per10  =  -0.166756904878
slope_per90  =  0.173692605497
stetson_k  =  0.803706119477
weighted_mean  =  15.2528741913
weighted_std  =  0.259151133951
