-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.292348642814
cusum  =  0.145296327035
eta  =  0.576010697195
hl_amp_ratio  =  0.858341003633
kurtosis  =  -0.863908576595
n_points  =  314
period  =  0.701134159319
period_SNR  =  31.2719025545
period_log10FAP  =  -30.1388454863
period_uncertainty  =  0.000133224554158
phase_cusum  =  0.282110560137
phase_eta  =  0.471242760082
phi21  =  1.20913170687
phi31  =  2.30222859284
quartile31  =  0.5075
r21  =  0.555114358964
r31  =  0.304674904774
shapiro_w  =  0.974950909615
skewness  =  -0.140103229015
slope_per10  =  -0.163883332085
slope_per90  =  0.1255045006
stetson_k  =  0.832631918158
weighted_mean  =  11.9505682422
weighted_std  =  0.304984517668
