-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.7


######### Lightcurve features #########

amplitude  =  0.171327755482
cusum  =  0.17766810926
eta  =  0.759122521288
hl_amp_ratio  =  0.773865484911
kurtosis  =  -0.257923627654
n_points  =  287
period  =  0.363203743158
period_SNR  =  23.704159456
period_log10FAP  =  -18.6562248519
period_uncertainty  =  3.7087340889e-05
phase_cusum  =  0.247476253618
phase_eta  =  1.18477605282
phi21  =  -4.26097041558
phi31  =  -4.50376264248
quartile31  =  0.27
r21  =  0.30993567087
r31  =  0.182018850304
shapiro_w  =  0.979217886925
skewness  =  -0.418618078716
slope_per10  =  -0.032289490338
slope_per90  =  0.0556276765954
stetson_k  =  0.77065656679
weighted_mean  =  17.800690251
weighted_std  =  0.200994014783
