-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.83


######### Lightcurve features #########

amplitude  =  0.165858077823
cusum  =  0.209595220439
eta  =  0.590647272309
hl_amp_ratio  =  0.627242421446
kurtosis  =  -1.04569957242
n_points  =  173
period  =  0.710083642334
period_SNR  =  23.8398225416
period_log10FAP  =  -18.228962231
period_uncertainty  =  0.000298932292742
phase_cusum  =  0.296139661375
phase_eta  =  0.274896734578
phi21  =  -1.98753581053
phi31  =  -3.68395449464
quartile31  =  0.25
r21  =  0.430971763385
r31  =  0.206750528718
shapiro_w  =  0.956436753273
skewness  =  -0.201673137028
slope_per10  =  -0.251655513694
slope_per90  =  0.527136948115
stetson_k  =  0.805172938799
weighted_mean  =  15.6779713754
weighted_std  =  0.148807330865
