-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.349782623949
cusum  =  0.142524440343
eta  =  0.650625777162
hl_amp_ratio  =  0.483075356921
kurtosis  =  -0.471950425866
n_points  =  183
period  =  0.599106082029
period_SNR  =  25.8662173668
period_log10FAP  =  -19.7600812682
period_uncertainty  =  0.000148545722115
phase_cusum  =  0.225104166654
phase_eta  =  0.152209092598
phi21  =  0.995104072013
phi31  =  2.30042480856
quartile31  =  0.35
r21  =  0.575154309567
r31  =  0.313651854016
shapiro_w  =  0.929129242897
skewness  =  -0.67246087099
slope_per10  =  -0.204193075889
slope_per90  =  0.295833344571
stetson_k  =  0.717910225303
weighted_mean  =  14.8722159217
weighted_std  =  0.306929972406
