-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.353205771711
cusum  =  0.17965856544
eta  =  0.550386885232
hl_amp_ratio  =  0.29340986251
kurtosis  =  -0.43033146816
n_points  =  222
period  =  0.564814441892
period_SNR  =  25.8611739301
period_log10FAP  =  -23.2635410186
period_uncertainty  =  0.000126187324598
phase_cusum  =  0.252502913375
phase_eta  =  0.238354881659
phi21  =  -2.41157224464
phi31  =  -4.43971888235
quartile31  =  0.4375
r21  =  0.470279922607
r31  =  0.310826789047
shapiro_w  =  0.892037391663
skewness  =  -0.831548594458
slope_per10  =  -0.101654937114
slope_per90  =  0.407210589515
stetson_k  =  0.717026799351
weighted_mean  =  14.4195562443
weighted_std  =  0.308852575945
