-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.249600271216
cusum  =  0.191031185124
eta  =  1.00265598168
hl_amp_ratio  =  0.420399741612
kurtosis  =  -0.561799455351
n_points  =  71
period  =  0.556452407395
period_SNR  =  15.325705306
period_log10FAP  =  -4.00376039026
period_uncertainty  =  0.000146463760882
phase_cusum  =  0.317676911138
phase_eta  =  0.437405747229
phi21  =  0.60341661872
phi31  =  2.1612533536
quartile31  =  0.29
r21  =  0.487367101451
r31  =  0.288625076951
shapiro_w  =  0.919254541397
skewness  =  -0.71151175799
slope_per10  =  -0.316362494486
slope_per90  =  0.283692212899
stetson_k  =  0.718965878682
weighted_mean  =  15.7879343356
weighted_std  =  0.225111987792
