-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.208713804386
cusum  =  0.136775199756
eta  =  0.727146112676
hl_amp_ratio  =  0.477582769576
kurtosis  =  -0.562774862507
n_points  =  367
period  =  0.642679753789
period_SNR  =  41.4993555905
period_log10FAP  =  -40.656374581
period_uncertainty  =  0.000132229568821
phase_cusum  =  0.216523033306
phase_eta  =  0.310763945223
phi21  =  0.938912431264
phi31  =  2.04396794898
quartile31  =  0.29
r21  =  0.44329226519
r31  =  0.436197541909
shapiro_w  =  0.943390488625
skewness  =  -0.587952489396
slope_per10  =  -0.120462639239
slope_per90  =  0.130226520583
stetson_k  =  0.7540935155
weighted_mean  =  16.6932138867
weighted_std  =  0.209349712798
