<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.329441468696
cusum  =  0.317593831822
eta  =  0.45203438017
hl_amp_ratio  =  0.866050767356
kurtosis  =  -0.97525676777
n_points  =  135
period  =  0.609155447827
period_SNR  =  16.3416033028
period_log10FAP  =  -11.266915242
period_uncertainty  =  0.000133998124972
phase_cusum  =  0.236990520741
phase_eta  =  0.425394084568
phi21  =  0.958029926141
phi31  =  1.98413331302
quartile31  =  0.455
r21  =  0.456965540587
r31  =  0.189773296089
shapiro_w  =  0.944571077824
skewness  =  -0.321507090633
slope_per10  =  -0.174858330359
slope_per90  =  0.395922747765
stetson_k  =  0.835052133895
weighted_mean  =  14.174191344
weighted_std  =  0.306383444924
</pre></body></html>