-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.337837617007
cusum  =  0.129106545115
eta  =  1.16000733382
hl_amp_ratio  =  0.488692770589
kurtosis  =  0.953078470806
n_points  =  142
period  =  0.511899095146
period_SNR  =  18.3540247438
period_log10FAP  =  -7.16239974446
period_uncertainty  =  0.00012396152504
phase_cusum  =  0.188570607527
phase_eta  =  0.462643805391
phi21  =  -2.50624101744
phi31  =  -4.61904425447
quartile31  =  0.1875
r21  =  0.517135337574
r31  =  0.222283376357
shapiro_w  =  0.933006048203
skewness  =  -0.985867308558
slope_per10  =  -0.129555612935
slope_per90  =  0.289191154633
stetson_k  =  0.706240803963
weighted_mean  =  14.8955963692
weighted_std  =  0.157933474717
