-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.217763191777
cusum  =  0.183153198214
eta  =  0.676308253013
hl_amp_ratio  =  0.696352274104
kurtosis  =  -0.557653320135
n_points  =  184
period  =  0.692846773163
period_SNR  =  31.4811637948
period_log10FAP  =  -23.69733497
period_uncertainty  =  0.000340493211176
phase_cusum  =  0.256017449572
phase_eta  =  0.179375017772
phi21  =  -1.854310281
phi31  =  -3.53555978332
quartile31  =  0.21
r21  =  0.535393666485
r31  =  0.274877638265
shapiro_w  =  0.968639969826
skewness  =  -0.242768831433
slope_per10  =  -0.25008571996
slope_per90  =  0.345500008059
stetson_k  =  0.763123402456
weighted_mean  =  15.4760216909
weighted_std  =  0.179987276144
