-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.285117254641
cusum  =  0.103340619134
eta  =  0.761236172175
hl_amp_ratio  =  0.530510675807
kurtosis  =  -0.220009289735
n_points  =  375
period  =  0.60272130762
period_SNR  =  44.5452092074
period_log10FAP  =  -44.0688895904
period_uncertainty  =  0.000101256858402
phase_cusum  =  0.296937178914
phase_eta  =  0.237580487718
phi21  =  1.10838604684
phi31  =  -0.771809355725
quartile31  =  0.4
r21  =  0.573803472624
r31  =  0.371582974894
shapiro_w  =  0.953397035599
skewness  =  -0.316063797101
slope_per10  =  -0.127614327957
slope_per90  =  0.17186666994
stetson_k  =  0.752075636007
weighted_mean  =  15.8342430794
weighted_std  =  0.265605561892
