-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.191111597259
cusum  =  0.112692726188
eta  =  0.905820023774
hl_amp_ratio  =  0.407936054167
kurtosis  =  -0.928342161563
n_points  =  172
period  =  0.675149945381
period_SNR  =  28.4049104108
period_log10FAP  =  -20.8978641109
period_uncertainty  =  0.000213807302303
phase_cusum  =  0.288301077786
phase_eta  =  0.201585746139
phi21  =  -1.83743605667
phi31  =  -0.487993869458
quartile31  =  0.26
r21  =  0.427566750584
r31  =  0.262496125869
shapiro_w  =  0.931136608124
skewness  =  -0.501287800735
slope_per10  =  -0.454899999313
slope_per90  =  0.4360223014
stetson_k  =  0.789580444766
weighted_mean  =  15.0505918079
weighted_std  =  0.166663856106
