-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.326683907016
cusum  =  0.170072170889
eta  =  0.564799997684
hl_amp_ratio  =  0.336658170759
kurtosis  =  -0.486032575301
n_points  =  200
period  =  0.47801937772
period_SNR  =  26.5721278791
period_log10FAP  =  -22.0076243978
period_uncertainty  =  0.00012155782795
phase_cusum  =  0.22168350701
phase_eta  =  0.328707206239
phi21  =  0.479941908492
phi31  =  -2.02384979447
quartile31  =  0.4925
r21  =  0.536185077391
r31  =  0.285610553145
shapiro_w  =  0.894824206829
skewness  =  -0.822217221094
slope_per10  =  -0.150473034994
slope_per90  =  0.128671047342
stetson_k  =  0.710135929791
weighted_mean  =  14.6159084615
weighted_std  =  0.305082201215
