-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.202522493272
cusum  =  0.130233006977
eta  =  0.592390883442
hl_amp_ratio  =  0.995967038025
kurtosis  =  -0.830101929644
n_points  =  333
period  =  0.592604591666
period_SNR  =  39.4874001427
period_log10FAP  =  -36.7554493097
period_uncertainty  =  0.000158588244728
phase_cusum  =  0.263490773024
phase_eta  =  0.258073825314
phi21  =  -2.52614249473
phi31  =  -0.929462518122
quartile31  =  0.29
r21  =  0.486744982033
r31  =  0.446912147149
shapiro_w  =  0.982442259789
skewness  =  0.0245461950894
slope_per10  =  -0.172186033859
slope_per90  =  0.171525002224
stetson_k  =  0.850734374716
weighted_mean  =  15.3552753552
weighted_std  =  0.18098132539
