-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.231406735783
cusum  =  0.199477580924
eta  =  0.481801627261
hl_amp_ratio  =  0.560696638413
kurtosis  =  -0.796182512364
n_points  =  171
period  =  0.610141588096
period_SNR  =  30.6173376726
period_log10FAP  =  -24.1685514933
period_uncertainty  =  0.000109125341042
phase_cusum  =  0.222419842683
phase_eta  =  0.071951635856
phi21  =  -2.18000461137
phi31  =  -4.12395298535
quartile31  =  0.27
r21  =  0.452967546543
r31  =  0.251121308486
shapiro_w  =  0.91217726469
skewness  =  -0.627661464551
slope_per10  =  -0.333938809174
slope_per90  =  0.452199999709
stetson_k  =  0.787592365472
weighted_mean  =  14.9810083434
weighted_std  =  0.184062398313
