-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  LPV_OSARG_AGB
class_probability =  0.25


######### Lightcurve features #########

amplitude  =  0.0621610277515
cusum  =  0.265937044208
eta  =  0.852951635019
hl_amp_ratio  =  0.744100396271
kurtosis  =  -0.709485936571
n_points  =  72
period  =  55.7720984106
period_SNR  =  11.83820383
period_log10FAP  =  -4.43637516429
period_uncertainty  =  0.917544110085
phase_cusum  =  0.211698604583
phase_eta  =  0.625628672153
phi21  =  -1.25709351604
phi31  =  -1.92223124822
quartile31  =  0.1125
r21  =  0.0670117270003
r31  =  0.355601463428
shapiro_w  =  0.943153262138
skewness  =  -0.507406160793
slope_per10  =  -35.8807029442
slope_per90  =  87.8449907273
stetson_k  =  0.827544029887
weighted_mean  =  13.7424030227
weighted_std  =  0.0708858577372
