-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.261419488659
cusum  =  0.21077817565
eta  =  0.618685479676
hl_amp_ratio  =  0.419831506138
kurtosis  =  -0.481312326909
n_points  =  313
period  =  0.717117351572
period_SNR  =  34.4336280049
period_log10FAP  =  -34.0914799548
period_uncertainty  =  0.000146422202767
phase_cusum  =  0.252205793624
phase_eta  =  0.180388718938
phi21  =  1.1328693186
phi31  =  2.47635103795
quartile31  =  0.34
r21  =  0.507636222267
r31  =  0.36865669057
shapiro_w  =  0.942464828491
skewness  =  -0.487910571034
slope_per10  =  -0.155226665859
slope_per90  =  0.208333339542
stetson_k  =  0.708530779939
weighted_mean  =  15.7455460527
weighted_std  =  0.244496039174
