-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.343120700351
cusum  =  0.140101090039
eta  =  0.681694760305
hl_amp_ratio  =  0.68061986676
kurtosis  =  -0.95876306997
n_points  =  198
period  =  0.513265981915
period_SNR  =  27.3902164546
period_log10FAP  =  -19.7209617889
period_uncertainty  =  0.000109013351301
phase_cusum  =  0.271450814666
phase_eta  =  0.558601568287
phi21  =  3.9022201941
phi31  =  5.29505711814
quartile31  =  0.4975
r21  =  0.398879051143
r31  =  0.246492306186
shapiro_w  =  0.928213238716
skewness  =  -0.483060939723
slope_per10  =  -0.0941400211585
slope_per90  =  0.219205721863
stetson_k  =  0.824054512067
weighted_mean  =  15.6212787981
weighted_std  =  0.303475337421
