-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.38


######### Lightcurve features #########

amplitude  =  0.21787393029
cusum  =  0.407480516969
eta  =  0.348618879013
hl_amp_ratio  =  0.37146013318
kurtosis  =  -0.943984258092
n_points  =  28
period  =  0.863502832129
period_SNR  =  5.74936553384
period_log10FAP  =  -0.400512305019
period_uncertainty  =  0.000179971418398
phase_cusum  =  0.452472777895
phase_eta  =  0.26597128887
phi21  =  1.64116117193
phi31  =  3.04534556105
quartile31  =  0.2425
r21  =  0.372683844045
r31  =  0.12235646934
shapiro_w  =  0.873283147812
skewness  =  -0.671204350534
slope_per10  =  -0.881899991073
slope_per90  =  0.688050002791
stetson_k  =  0.698840323861
weighted_mean  =  15.0703448276
weighted_std  =  0.135217562247
