<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.189027988476
cusum  =  0.113535516264
eta  =  0.600967243684
hl_amp_ratio  =  0.858010851076
kurtosis  =  -1.13103060133
n_points  =  315
period  =  0.60977563389
period_SNR  =  42.4459844455
period_log10FAP  =  -44.649651237
period_uncertainty  =  0.000125701022429
phase_cusum  =  0.253467380578
phase_eta  =  0.222869142346
phi21  =  -1.75198977848
phi31  =  -0.72167655792
quartile31  =  0.295
r21  =  0.404699428659
r31  =  0.249326004497
shapiro_w  =  0.936463296413
skewness  =  -0.254253891919
slope_per10  =  -0.274333326767
slope_per90  =  0.274000014178
stetson_k  =  0.888197922553
weighted_mean  =  15.4419323184
weighted_std  =  0.165948602161
</pre></body></html>