-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.43


######### Lightcurve features #########

amplitude  =  0.280119577156
cusum  =  0.198219355106
eta  =  1.24541407825
hl_amp_ratio  =  0.452857843683
kurtosis  =  -0.270735265961
n_points  =  38
period  =  0.562109946165
period_SNR  =  11.031916382
period_log10FAP  =  -0.262419892094
period_uncertainty  =  0.000112078286956
phase_cusum  =  0.262105803751
phase_eta  =  0.540839319427
phi21  =  4.14633214789
phi31  =  5.16001741392
quartile31  =  0.3575
r21  =  0.294845262203
r31  =  0.166832956421
shapiro_w  =  0.945177853107
skewness  =  -0.684193750213
slope_per10  =  -0.221954597638
slope_per90  =  1.37382781835
stetson_k  =  0.728225039929
weighted_mean  =  16.127012019
weighted_std  =  0.246295493102
