-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.52


######### Lightcurve features #########

amplitude  =  0.0964419430936
cusum  =  0.145357684962
eta  =  1.02363234445
hl_amp_ratio  =  0.8715231267
kurtosis  =  -0.381662659484
n_points  =  105
period  =  0.398071866268
period_SNR  =  14.088154032
period_log10FAP  =  -6.88966949187
period_uncertainty  =  0.000103020674093
phase_cusum  =  0.221637783953
phase_eta  =  0.685371191315
phi21  =  -1.90625435448
phi31  =  -0.991717205496
quartile31  =  0.17
r21  =  0.557599229804
r31  =  0.109744601004
shapiro_w  =  0.97300773859
skewness  =  -0.431290358781
slope_per10  =  -0.430266906813
slope_per90  =  0.272586939027
stetson_k  =  0.819133677141
weighted_mean  =  15.0774381347
weighted_std  =  0.107322797897
