-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.309719995754
cusum  =  0.172366558148
eta  =  0.520805449064
hl_amp_ratio  =  0.428171143607
kurtosis  =  -0.419104019847
n_points  =  237
period  =  0.545088346432
period_SNR  =  30.576078166
period_log10FAP  =  -30.6940017126
period_uncertainty  =  0.000118086734686
phase_cusum  =  0.239012413763
phase_eta  =  0.150748836118
phi21  =  -2.1856651813
phi31  =  -4.39799858589
quartile31  =  0.44
r21  =  0.466142388074
r31  =  0.27277915972
shapiro_w  =  0.90695732832
skewness  =  -0.794866844075
slope_per10  =  -0.124888547152
slope_per90  =  0.257232127478
stetson_k  =  0.774921115636
weighted_mean  =  15.2281602554
weighted_std  =  0.276646312399
